-- OIDC front-channel logout support (per-provider opt-in).
-- Front-channel logout is browser-mediated: on an IdP-initiated logout the IdP
-- renders the RP's frontchannel_logout_uri in a hidden iframe, passing `iss`
-- and `sid` query params. codit terminates the matching session by `sid`
-- (cookie-independent, so it survives cross-site iframe cookie restrictions),
-- reusing the same oidc_sid capture and issuer validation as back-channel
-- logout. The flag gates whether a provider advertises/accepts the endpoint.
ALTER TABLE auth_providers ADD COLUMN oidc_frontchannel_logout_enabled INTEGER NOT NULL DEFAULT 0;
